\chapter{Declaration of Academic Integrity --- Eidesstattliche Erklärung}
I have written this thesis independently, and I have not used any other sources or aids other than the ones stated.

Düsseldorf, February 2022

\vspace{1.5cm}

Nareshkumar Rao

This thesis was supervised by:\\
1. Examiner: Prof. Dr.-Ing. M. Protogerakis\\
2. Examiner: Prof. Dr.-Ing. R. Beck

\vspace{2em}
\hrule
\vspace{2em}

Diese Arbeit ist von mir selbstständig angefertigt und verfasst worden. Es sind keine anderen als die angegebenen Quellen und Hilfsmittel benutzt worden.

Düsseldorf, Februar 2022

\vspace{1.5cm}

Nareshkumar Rao

Diese Arbeit wurde betreut von:\\
1. Prüfer: Prof. Dr.-Ing. M. Protogerakis\\
2. Prüfer: Prof. Dr.-Ing. R. Beck