\begin{titlepage}
	\begin{center}
		\vspace*{1cm}
		\begin{Huge}
		\textbf{Measuring Bulk Material Flow using Commercially-Available LIDAR Sensors}\par
%		\textbf{---Final Draft---}\par
		\end{Huge}
		\vfill
		\large
		Master's Thesis in Electrical Engineering \& Information Technology (Automation)\\
		presented at the\\
		~\\
		Faculty of Electrical Engineering \& Information Technology of the University of Applied Sciences, Düsseldorf\\
		~\\
		by\\
		~\\
		\begin{LARGE}
		Nareshkumar Rao		
		\end{LARGE}
		\vfill
		\normalsize
		\begin{align*}
		&\text{1. Examiner: Prof. Dr.-Ing. M. Protogerakis}\\
		&\text{2. Examiner: Prof. Dr.-Ing. R. Beck}
		\end{align*}
		\vfill
		Düsseldorf\\
		February 2022
	\end{center}
\end{titlepage}